Figure 7. Horizontal maximum shear strain rates. The amount and direction of the maximum shear strain rates are shown by arrows with error ellipses representing one standard deviation. The amount of the maximum shear strain rates are also shown by degree of greyness in the region where the maximum shear rates are resolved. The open triangles denote the station locations.