Figure 5. Station residual velocities. Solid lines are the fault patches whose parameters are given in Table 4. The dark grey and light grey regions are the surface projections of the locked and deeper deforming sections of the thrust faults respectively. Velocity residuals are the velocity solutions minus the Phase II model-predicted station velocities. Error ellipses are one standard deviation.