Figure 4. Station velocity profile parallel (a) and normal (b) to the Mojave section of the SAF. Open squares are the velocity solution components with one standard deviation error bars, and solid triangles are the velocity components predicted from a fault model described in the text. The SAF is located at x = 0 and shown by a vertical line.